0 100 200 300 400 500 600 700 800 900 1000 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

Γ (s^{-1} )

NMR Signal (arbitrary units)

Max signal ∝ M_{eq}(1-x)

∝ M_{eq}(1-x)(1-e^{- Γ τ /2})/(1-xe^{- Γ τ /2})