0 50 100 150 200 250 300 350 400 0

0.01

0.02

0.03

0.04

0.05

0.06

0.07

Temperature (?K)

Resistance (Ohms)

Pt on Sapphire on Diode on Base, Varnished

While Cooling Every 30s or so

Scatter due to thermal lag while cooling/warming

Probably real B-W behavior

Drift indicates thermal lag